Copyright © 1994 by Mark Williams Company.

All rights reserved.

This publication conveys information that is the property of Mark Williams Company. It shall not be copied, reproduced or duplicated in whole or in part without the express written permission of Mark Williams Company. Mark Williams Company makes no warranty of any kind with respect to this material and disclaims any implied warranties of merchantability or fitness for any particular purpose.

The information contained herein is subject to change without notice.

COHERENT™ is a trademark of Mark Williams Company. UNIX™ is a trademark of Unix Systems Laboratories. MS-DOS™ is a trademark of Microsoft Corporation. PostScript™ is a trademark of Adobe Systems Incorporated. All other products are trademarks or registered trademarks of the respective holders.

Revision 11 Printing 5 4 3 2 1

Published by Mark Williams Company, 60 Revere Drive, Northbrook, Illinois 60062.

Sales: Phone: (800) 636-6700 (US) — (708) 291-6700 (outside United States) FAX: (708) 291-6750 E-mail: sales@mwc.com Technical Support:

Phone: (708) 291-6700 FAX: (708) 291-6750 E-mail: support@mwc.com CompuServ: 76256,427

This manual was written under the COHERENT operating system, using the MicroEMACS text editor. Text formatting was performed by the COHERENT edition of the troff text formatter, generating PostScript. Page design was implemented with custom-written macros written in the troff text-formatting language and in PostScript. Capitals and ornaments are derived from the Paris Book of the Hours (1510), and were supplied in encapsulated PostScript form by BBL Typographic, 137 Narrow Neck Rd., Katoomba, NSW 2780, Australia (bblart@peg.apc.org). The key-caps font was supplied by SoftMaker, Inc., 2195 Faraday Avenue, Suite A, Carlsbad, CA 92008. Diagrams were drawn under the COHERENT implementation of X, using the program xfig, which was originally written by Supoj Sutanthavibul of the University of Texas at Austin. Typesetting of this manual, from the table of contents through the index, was executed by one script written in the COHERENT Bourne shell. Camera-ready copy was printed on a Hewlett-Packard LaserJet IIP printer using the Pacific Page PostScript cartridge.