The Lexicon

The rest of this manual consists of the Lexicon. The Lexicon consists of more than 1,000 articles, each of which describes a function or command, defines a term, or otherwise gives you useful information. The articles appear in alphabetical order.

Internally, the Lexicon has a tree structure. The ‘‘root’’ entry is the one for Lexicon. It, in turn, introduces (or ‘‘branches to’’) three ‘‘overview’’: Running COHERENT, Administering COHERENT, and Programming COHERENT. Each overview article points to a group of related entries. For example, the article Programming COHERENT points to the articles on the COHERENT C compiler and to articles that introduce the library functions, macros, and header files included with COHERENT.

Each Lexicon entry cross-references other entries. These cross-references point up the documentation tree, to its overview article and, ultimately, to the entry for COHERENT; down the tree to subordinate entries; and across to entries on related subjects. For example, the entry for getchar() cross-references STDIO, which is its overview article, plus putchar() and getc(), which are related entries of interest to the user. The Lexicon is designed so that you can trace from any one entry to any other, simply by following the chain of cross-references up and down the documentation tree.

For more information on how to use the Lexicon and how it is organized, see the Lexicon entry for COHERENT.

301

302