UserEvaluationReport

To keep this manual free of errors and to help us improve COHERENT, please sent us your reactions. Please fill in the form below, detach it, and mail it to: Mark Williams Company 60 Revere Drive Northbrook, IL 60062 Name: ____________________________________________________________________ Company: ____________________________________________________________________ Address: ____________________________________________________________________ City/State/Zip: ____________________________________________________________________ Phone: ____________________________________________________________________ Date: ____________________________________________________________________

Version and hardware used:

Did you find any errors in the manual?

Can you suggest any improvements to the manual?

Did you find any bugs in the software?

Can you suggest any improvements or enhancements to the software?

Additional comments: